0

0.1

0.2

0.3

0.4

0.5

0.6

Distance [m]

Left Forearm

0

0.1

0.2

0.3

0.4

0.5

0.6 Right Hand

10 12 14 16 18 20 22 24 0

0.4 0.5

1

Time [s]

Activation int1 int2 int3 ext1 ext2 ext3

25 26 27 28 29 30 31 32 33 34 35 36 0

0.4 0.5

1

Time [s]

1 2 3 4